---
title: "exclusion_exam"
description: "Positive statement to record that a physical examination or clinical test was not performed."
---

Positive statement to record that a physical examination or clinical test was not performed.

**Purpose.** To record that a physical examination or clinical test was not performed.

## Source

| Model | Leg | Role |
|---|---|---|
| `openEHR-EHR-CLUSTER.exclusion_exam.v1` | openEHR | defines this table |

## Columns

| Column | Type | Null | Description | Source |
|---|---|---|---|---|
| `id` | `uuid primary key` | no | Primary key. | — |
| `examination_not_done` | `boolean` | yes | Examination not done | `/items[at0001]` |
| `reason` | `text` | yes | Reason | `/items[at0002]` |

## Referenced by

- [`categorical_loudness_scaling_no_test_result`](/docs/tables/categorical_loudness_scaling_no_test_result) via `exclusion_exam_id`
- [`intraocular_pressure_test_not_done`](/docs/tables/intraocular_pressure_test_not_done) via `exclusion_exam_id`
- [`urinalysis_exam_not_done`](/docs/tables/urinalysis_exam_not_done) via `exclusion_exam_id`
- [`visual_acuity_test_not_done`](/docs/tables/visual_acuity_test_not_done) via `exclusion_exam_id`

